alter table t_st_schedule_scheme add column `adjust_rate` int DEFAULT NULL COMMENT '调整速率';

alter table t_st_schedule_scheme add column `warning_adjust_rate` int DEFAULT NULL COMMENT '预警调整速率';

alter table t_mm_predict_alarm_config modify column `comp_length` varchar(30) COMMENT '比较长度';