CREATE
database if NOT EXISTS `iailab_fast_tenant_ansteel` default character set utf8mb4 collate utf8mb4_general_ci;
USE
`iailab_fast_tenant_ansteel`;

    -- 定时任务
CREATE TABLE schedule_job
(
    id              bigint NOT NULL COMMENT 'id',
    bean_name       varchar(200)  DEFAULT NULL COMMENT 'spring bean名称',
    params          varchar(2000) DEFAULT NULL COMMENT '参数',
    cron_expression varchar(100)  DEFAULT NULL COMMENT 'cron表达式',
    status          tinyint unsigned COMMENT '任务状态  0：暂停  1：正常',
    remark          varchar(255)  DEFAULT NULL COMMENT '备注',
    creator         bigint COMMENT '创建者',
    create_date     datetime COMMENT '创建时间',
    updater         bigint COMMENT '更新者',
    update_date     datetime COMMENT '更新时间',
    PRIMARY KEY (id),
    key             idx_create_date (create_date)
) ENGINE = InnoDB
  DEFAULT CHARSET = utf8mb4 COMMENT ='定时任务';

-- 定时任务日志
CREATE TABLE schedule_job_log
(
    id          bigint NOT NULL COMMENT 'id',
    job_id      bigint NOT NULL COMMENT '任务id',
    bean_name   varchar(200)  DEFAULT NULL COMMENT 'spring bean名称',
    params      varchar(2000) DEFAULT NULL COMMENT '参数',
    status      tinyint unsigned NOT NULL COMMENT '任务状态    0：失败    1：成功',
    error       varchar(2000) DEFAULT NULL COMMENT '失败信息',
    times       int    NOT NULL COMMENT '耗时(单位：毫秒)',
    create_date datetime COMMENT '创建时间',
    PRIMARY KEY (id),
    key         idx_job_id (job_id),
    key         idx_create_date (create_date)
) ENGINE = InnoDB
  DEFAULT CHARSET = utf8mb4 COMMENT ='定时任务日志';

--  quartz自带表结构
CREATE TABLE QRTZ_JOB_DETAILS
(
    SCHED_NAME        VARCHAR(120) NOT NULL,
    JOB_NAME          VARCHAR(200) NOT NULL,
    JOB_GROUP         VARCHAR(200) NOT NULL,
    DESCRIPTION       VARCHAR(250) NULL,
    JOB_CLASS_NAME    VARCHAR(250) NOT NULL,
    IS_DURABLE        VARCHAR(1)   NOT NULL,
    IS_NONCONCURRENT  VARCHAR(1)   NOT NULL,
    IS_UPDATE_DATA    VARCHAR(1)   NOT NULL,
    REQUESTS_RECOVERY VARCHAR(1)   NOT NULL,
    JOB_DATA          BLOB NULL,
    PRIMARY KEY (SCHED_NAME, JOB_NAME, JOB_GROUP)
) ENGINE = InnoDB
  DEFAULT CHARSET = utf8;

CREATE TABLE QRTZ_TRIGGERS
(
    SCHED_NAME     VARCHAR(120) NOT NULL,
    TRIGGER_NAME   VARCHAR(200) NOT NULL,
    TRIGGER_GROUP  VARCHAR(200) NOT NULL,
    JOB_NAME       VARCHAR(200) NOT NULL,
    JOB_GROUP      VARCHAR(200) NOT NULL,
    DESCRIPTION    VARCHAR(250) NULL,
    NEXT_FIRE_TIME BIGINT(13)   NULL,
    PREV_FIRE_TIME BIGINT(13)   NULL,
    PRIORITY       INTEGER NULL,
    TRIGGER_STATE  VARCHAR(16)  NOT NULL,
    TRIGGER_TYPE   VARCHAR(8)   NOT NULL,
    START_TIME     BIGINT(13)   NOT NULL,
    END_TIME       BIGINT(13)   NULL,
    CALENDAR_NAME  VARCHAR(200) NULL,
    MISFIRE_INSTR  SMALLINT(2)  NULL,
    JOB_DATA       BLOB NULL,
    PRIMARY KEY (SCHED_NAME, TRIGGER_NAME, TRIGGER_GROUP),
    FOREIGN KEY (SCHED_NAME, JOB_NAME, JOB_GROUP)
        REFERENCES QRTZ_JOB_DETAILS (SCHED_NAME, JOB_NAME, JOB_GROUP)
) ENGINE = InnoDB
  DEFAULT CHARSET = utf8;

CREATE TABLE QRTZ_SIMPLE_TRIGGERS
(
    SCHED_NAME      VARCHAR(120) NOT NULL,
    TRIGGER_NAME    VARCHAR(200) NOT NULL,
    TRIGGER_GROUP   VARCHAR(200) NOT NULL,
    REPEAT_COUNT    BIGINT(7)    NOT NULL,
    REPEAT_INTERVAL BIGINT(12)   NOT NULL,
    TIMES_TRIGGERED BIGINT(10)   NOT NULL,
    PRIMARY KEY (SCHED_NAME, TRIGGER_NAME, TRIGGER_GROUP),
    FOREIGN KEY (SCHED_NAME, TRIGGER_NAME, TRIGGER_GROUP)
        REFERENCES QRTZ_TRIGGERS (SCHED_NAME, TRIGGER_NAME, TRIGGER_GROUP)
) ENGINE = InnoDB
  DEFAULT CHARSET = utf8;

CREATE TABLE QRTZ_CRON_TRIGGERS
(
    SCHED_NAME      VARCHAR(120) NOT NULL,
    TRIGGER_NAME    VARCHAR(200) NOT NULL,
    TRIGGER_GROUP   VARCHAR(200) NOT NULL,
    CRON_EXPRESSION VARCHAR(120) NOT NULL,
    TIME_ZONE_ID    VARCHAR(80),
    PRIMARY KEY (SCHED_NAME, TRIGGER_NAME, TRIGGER_GROUP),
    FOREIGN KEY (SCHED_NAME, TRIGGER_NAME, TRIGGER_GROUP)
        REFERENCES QRTZ_TRIGGERS (SCHED_NAME, TRIGGER_NAME, TRIGGER_GROUP)
) ENGINE = InnoDB
  DEFAULT CHARSET = utf8;

CREATE TABLE QRTZ_SIMPROP_TRIGGERS
(
    SCHED_NAME    VARCHAR(120) NOT NULL,
    TRIGGER_NAME  VARCHAR(200) NOT NULL,
    TRIGGER_GROUP VARCHAR(200) NOT NULL,
    STR_PROP_1    VARCHAR(512) NULL,
    STR_PROP_2    VARCHAR(512) NULL,
    STR_PROP_3    VARCHAR(512) NULL,
    INT_PROP_1    INT NULL,
    INT_PROP_2    INT NULL,
    LONG_PROP_1   BIGINT NULL,
    LONG_PROP_2   BIGINT NULL,
    DEC_PROP_1    NUMERIC(13, 4) NULL,
    DEC_PROP_2    NUMERIC(13, 4) NULL,
    BOOL_PROP_1   VARCHAR(1) NULL,
    BOOL_PROP_2   VARCHAR(1) NULL,
    PRIMARY KEY (SCHED_NAME, TRIGGER_NAME, TRIGGER_GROUP),
    FOREIGN KEY (SCHED_NAME, TRIGGER_NAME, TRIGGER_GROUP)
        REFERENCES QRTZ_TRIGGERS (SCHED_NAME, TRIGGER_NAME, TRIGGER_GROUP)
) ENGINE = InnoDB
  DEFAULT CHARSET = utf8;

CREATE TABLE QRTZ_BLOB_TRIGGERS
(
    SCHED_NAME    VARCHAR(120) NOT NULL,
    TRIGGER_NAME  VARCHAR(200) NOT NULL,
    TRIGGER_GROUP VARCHAR(200) NOT NULL,
    BLOB_DATA     BLOB NULL,
    PRIMARY KEY (SCHED_NAME, TRIGGER_NAME, TRIGGER_GROUP),
    INDEX (SCHED_NAME, TRIGGER_NAME, TRIGGER_GROUP),
    FOREIGN KEY (SCHED_NAME, TRIGGER_NAME, TRIGGER_GROUP)
        REFERENCES QRTZ_TRIGGERS (SCHED_NAME, TRIGGER_NAME, TRIGGER_GROUP)
) ENGINE = InnoDB
  DEFAULT CHARSET = utf8;

CREATE TABLE QRTZ_CALENDARS
(
    SCHED_NAME    VARCHAR(120) NOT NULL,
    CALENDAR_NAME VARCHAR(200) NOT NULL,
    CALENDAR      BLOB         NOT NULL,
    PRIMARY KEY (SCHED_NAME, CALENDAR_NAME)
) ENGINE = InnoDB
  DEFAULT CHARSET = utf8;

CREATE TABLE QRTZ_PAUSED_TRIGGER_GRPS
(
    SCHED_NAME    VARCHAR(120) NOT NULL,
    TRIGGER_GROUP VARCHAR(200) NOT NULL,
    PRIMARY KEY (SCHED_NAME, TRIGGER_GROUP)
) ENGINE = InnoDB
  DEFAULT CHARSET = utf8;

CREATE TABLE QRTZ_FIRED_TRIGGERS
(
    SCHED_NAME        VARCHAR(120) NOT NULL,
    ENTRY_ID          VARCHAR(95)  NOT NULL,
    TRIGGER_NAME      VARCHAR(200) NOT NULL,
    TRIGGER_GROUP     VARCHAR(200) NOT NULL,
    INSTANCE_NAME     VARCHAR(200) NOT NULL,
    FIRED_TIME        BIGINT(13)   NOT NULL,
    SCHED_TIME        BIGINT(13)   NOT NULL,
    PRIORITY          INTEGER      NOT NULL,
    STATE             VARCHAR(16)  NOT NULL,
    JOB_NAME          VARCHAR(200) NULL,
    JOB_GROUP         VARCHAR(200) NULL,
    IS_NONCONCURRENT  VARCHAR(1) NULL,
    REQUESTS_RECOVERY VARCHAR(1) NULL,
    PRIMARY KEY (SCHED_NAME, ENTRY_ID)
) ENGINE = InnoDB
  DEFAULT CHARSET = utf8;

CREATE TABLE QRTZ_SCHEDULER_STATE
(
    SCHED_NAME        VARCHAR(120) NOT NULL,
    INSTANCE_NAME     VARCHAR(200) NOT NULL,
    LAST_CHECKIN_TIME BIGINT(13)   NOT NULL,
    CHECKIN_INTERVAL  BIGINT(13)   NOT NULL,
    PRIMARY KEY (SCHED_NAME, INSTANCE_NAME)
) ENGINE = InnoDB
  DEFAULT CHARSET = utf8;

CREATE TABLE QRTZ_LOCKS
(
    SCHED_NAME VARCHAR(120) NOT NULL,
    LOCK_NAME  VARCHAR(40)  NOT NULL,
    PRIMARY KEY (SCHED_NAME, LOCK_NAME)
) ENGINE = InnoDB
  DEFAULT CHARSET = utf8;

CREATE INDEX IDX_QRTZ_J_REQ_RECOVERY ON QRTZ_JOB_DETAILS (SCHED_NAME, REQUESTS_RECOVERY);
CREATE INDEX IDX_QRTZ_J_GRP ON QRTZ_JOB_DETAILS (SCHED_NAME, JOB_GROUP);

CREATE INDEX IDX_QRTZ_T_J ON QRTZ_TRIGGERS (SCHED_NAME, JOB_NAME, JOB_GROUP);
CREATE INDEX IDX_QRTZ_T_JG ON QRTZ_TRIGGERS (SCHED_NAME, JOB_GROUP);
CREATE INDEX IDX_QRTZ_T_C ON QRTZ_TRIGGERS (SCHED_NAME, CALENDAR_NAME);
CREATE INDEX IDX_QRTZ_T_G ON QRTZ_TRIGGERS (SCHED_NAME, TRIGGER_GROUP);
CREATE INDEX IDX_QRTZ_T_STATE ON QRTZ_TRIGGERS (SCHED_NAME, TRIGGER_STATE);
CREATE INDEX IDX_QRTZ_T_N_STATE ON QRTZ_TRIGGERS (SCHED_NAME, TRIGGER_NAME, TRIGGER_GROUP, TRIGGER_STATE);
CREATE INDEX IDX_QRTZ_T_N_G_STATE ON QRTZ_TRIGGERS (SCHED_NAME, TRIGGER_GROUP, TRIGGER_STATE);
CREATE INDEX IDX_QRTZ_T_NEXT_FIRE_TIME ON QRTZ_TRIGGERS (SCHED_NAME, NEXT_FIRE_TIME);
CREATE INDEX IDX_QRTZ_T_NFT_ST ON QRTZ_TRIGGERS (SCHED_NAME, TRIGGER_STATE, NEXT_FIRE_TIME);
CREATE INDEX IDX_QRTZ_T_NFT_MISFIRE ON QRTZ_TRIGGERS (SCHED_NAME, MISFIRE_INSTR, NEXT_FIRE_TIME);
CREATE INDEX IDX_QRTZ_T_NFT_ST_MISFIRE ON QRTZ_TRIGGERS (SCHED_NAME, MISFIRE_INSTR, NEXT_FIRE_TIME, TRIGGER_STATE);
CREATE INDEX IDX_QRTZ_T_NFT_ST_MISFIRE_GRP ON QRTZ_TRIGGERS (SCHED_NAME, MISFIRE_INSTR, NEXT_FIRE_TIME, TRIGGER_GROUP,
                                                             TRIGGER_STATE);

CREATE INDEX IDX_QRTZ_FT_TRIG_INST_NAME ON QRTZ_FIRED_TRIGGERS (SCHED_NAME, INSTANCE_NAME);
CREATE INDEX IDX_QRTZ_FT_INST_JOB_REQ_RCVRY ON QRTZ_FIRED_TRIGGERS (SCHED_NAME, INSTANCE_NAME, REQUESTS_RECOVERY);
CREATE INDEX IDX_QRTZ_FT_J_G ON QRTZ_FIRED_TRIGGERS (SCHED_NAME, JOB_NAME, JOB_GROUP);
CREATE INDEX IDX_QRTZ_FT_JG ON QRTZ_FIRED_TRIGGERS (SCHED_NAME, JOB_GROUP);
CREATE INDEX IDX_QRTZ_FT_T_G ON QRTZ_FIRED_TRIGGERS (SCHED_NAME, TRIGGER_NAME, TRIGGER_GROUP);
CREATE INDEX IDX_QRTZ_FT_TG ON QRTZ_FIRED_TRIGGERS (SCHED_NAME, TRIGGER_GROUP);


-- ----------------------------
-- 电力功率因数-电网拓扑
-- ----------------------------
DROP TABLE IF EXISTS `t_power_net_factor`;
CREATE TABLE `t_power_net_factor`
(
    `id`         varchar(36) NOT NULL COMMENT 'id',
    `group_name` varchar(50) NULL DEFAULT NULL COMMENT '分组名称',
    `node_name`  varchar(50) NULL DEFAULT NULL COMMENT '节点名称',
    `cur_p`      varchar(50) NULL DEFAULT NULL COMMENT '当前有功',
    `cur_q`      varchar(50) NULL DEFAULT NULL COMMENT '当前无功',
    `cur_cos`    varchar(50) NULL DEFAULT NULL COMMENT '当前功率因数',
    `pre_p`      varchar(50) NULL DEFAULT NULL COMMENT '预测有功',
    `pre_q`      varchar(50) NULL DEFAULT NULL COMMENT '预测无功',
    `pre_cos`    varchar(50) NULL DEFAULT NULL COMMENT '预测功率因数',
    `item_id`    varchar(50) NULL DEFAULT NULL COMMENT '预测项ID',
    `out_id`     varchar(50) NULL DEFAULT NULL COMMENT '预测项输出ID',
    `limit_h`    decimal(6, 3) NULL DEFAULT NULL COMMENT '上限',
    `limit_l`    decimal(6, 3) NULL DEFAULT NULL COMMENT '下限',
    `status`     int DEFAULT 0 COMMENT '是否超限(0:正常，1：超限)',
    `sort`       int NULL DEFAULT NULL COMMENT '排序',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '电力功率因数电网拓扑';

ALTER TABLE `t_power_net_factor`
    ADD COLUMN `cur_flag` int DEFAULT 0 COMMENT '无功返送(1:大于0是，-1：小于0是)';

ALTER TABLE `t_power_net_factor`
    ADD COLUMN `node_code`  varchar(50) NULL DEFAULT NULL COMMENT '节点编号';

-- ----------------------------
-- 电力功率因数-发电机组实时状态
-- ----------------------------
DROP TABLE IF EXISTS `t_power_gen_status`;
CREATE TABLE `t_power_gen_status`
(
    `id`      varchar(36) NOT NULL COMMENT 'id',
    `name`    varchar(50) NULL DEFAULT NULL COMMENT '机组名称',
    `cur_p`   varchar(50) NULL DEFAULT NULL COMMENT '当前有功',
    `cur_q`   varchar(50) NULL DEFAULT NULL COMMENT '当前无功',
    `cur_cos` varchar(50) NULL DEFAULT NULL COMMENT '当前功率因数',
    `limit_h` decimal(6, 3) NULL DEFAULT NULL COMMENT '上限',
    `limit_l` decimal(6, 3) NULL DEFAULT NULL COMMENT '下限',
    `status`  int DEFAULT 0 COMMENT '是否超限(0:正常，1：超限)',
    `sort`    int NULL DEFAULT NULL COMMENT '排序',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '电力功率因数发电机组实时状态';

-- ----------------------------
-- 电力功率因数-电容器投运状态
-- ----------------------------
DROP TABLE IF EXISTS `t_power_capacitor_status`;
CREATE TABLE `t_power_capacitor_status`
(
    `id`          varchar(36) NOT NULL COMMENT 'id',
    `name`        varchar(50) NULL DEFAULT NULL COMMENT '电容器名称',
    `main_count`  varchar(50) NULL DEFAULT NULL COMMENT '主变数量',
    `main_point`  varchar(500) NULL DEFAULT NULL COMMENT '主变测点编码',
    `child_count` varchar(50) NULL DEFAULT NULL COMMENT '下属数量',
    `child_point` varchar(500) NULL DEFAULT NULL COMMENT '下属测点编码',
    `on_count`    varchar(500) NULL DEFAULT NULL COMMENT '投运数量',
    `remark`      varchar(50) NULL DEFAULT NULL COMMENT '备注',
    `sort`        int NULL DEFAULT NULL COMMENT '排序',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '电力功率因数电容器投运状态';

-- ----------------------------
-- 电力功率因数-管控功率因数主表
-- ----------------------------
DROP TABLE IF EXISTS `t_power_control_main`;
CREATE TABLE `t_power_control_main`
(
    `id`     varchar(36) NOT NULL COMMENT 'id',
    `name`   varchar(50) NULL DEFAULT NULL COMMENT '名称',
    `remark` varchar(50) NULL DEFAULT NULL COMMENT '备注',
    `sort`   int NULL DEFAULT NULL COMMENT '排序',
    PRIMARY KEY (`id`) USING BTREE,
    UNIQUE INDEX `uk_name` (`name`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '电力功率因数管控功率因数主表';

ALTER TABLE `t_power_control_main`
    ADD COLUMN `limit_h` decimal(6, 4) NULL DEFAULT NULL COMMENT '上限';
ALTER TABLE `t_power_control_main`
    ADD COLUMN `limit_l` decimal(6, 4) NULL DEFAULT NULL COMMENT '下限',

-- ----------------------------
-- 电力功率因数-管控功率因数从表
-- ----------------------------
DROP TABLE IF EXISTS `t_power_control_det`;
CREATE TABLE `t_power_control_det`
(
    `id`         varchar(36) NOT NULL COMMENT 'id',
    `control_id` varchar(36) NOT NULL COMMENT '主表ID',
    `name`       varchar(50) NULL DEFAULT NULL COMMENT '名称',
    `point`      varchar(50) NULL DEFAULT NULL COMMENT '测点',
    `limit_l`    decimal(6, 3) NULL DEFAULT NULL COMMENT '下限',
    `status`     int DEFAULT 0 COMMENT '是否超限(0:正常，1：超限)',
    `sort`       int NULL DEFAULT NULL COMMENT '排序',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '电力功率因数管控功率因数从表';


-- ----------------------------
-- 焦化工序-工序指标配置
-- ----------------------------
CREATE TABLE `t_coking_process_conf`
(
    `id`        varchar(36) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL COMMENT 'id',
    `info_type` varchar(10) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci  DEFAULT NULL COMMENT '信息类型（0：生产情况，1：能源发生，2：能源消耗）',
    `ind_type`  varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci  DEFAULT NULL COMMENT '指标类型（prod_day,main,child）',
    `data_type` varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci  DEFAULT NULL COMMENT '数据类型（测点，指标）',
    `point_no`  varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci  DEFAULT NULL COMMENT '测点编码',
    `ind_code`  varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci  DEFAULT NULL COMMENT '指标编码',
    `ind_name`  varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci  DEFAULT NULL COMMENT '指标名称',
    `ind_unit`  varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci  DEFAULT NULL COMMENT '指标单位',
    `remark`    varchar(100) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '备注',
    `ext1`      varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci  DEFAULT NULL COMMENT '拓展字段1',
    `ext2`      varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci  DEFAULT NULL COMMENT '拓展字段2',
    `ext3`      varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci  DEFAULT NULL COMMENT '拓展字段3',
    `ext4`      varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci  DEFAULT NULL COMMENT '拓展字段4',
    `ext5`      varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci  DEFAULT NULL COMMENT '拓展字段5',
    `sort`      int                                                           DEFAULT NULL COMMENT '排序',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='焦化工序工序指标配置';

-- ----------------------------
-- 焦化工序-日生产信息
-- ----------------------------
DROP TABLE IF EXISTS `t_coking_prod_day`;
CREATE TABLE `t_coking_prod_day`
(
    `id`        varchar(36) NOT NULL COMMENT 'id',
    `clock`     varchar(20) NULL DEFAULT NULL COMMENT '查询时间',
    `info_type` varchar(10) NULL DEFAULT NULL COMMENT '信息类型（0：生产情况，1：能源发生，2：能源消耗）',
    `ind_name`  varchar(50) NULL DEFAULT NULL COMMENT '数据名称',
    `ind_unit`  varchar(50) NULL DEFAULT NULL COMMENT '数据单位',
    `ind_value` varchar(50) NULL DEFAULT NULL COMMENT '数据值',
    `sort`      int NULL DEFAULT NULL COMMENT '排序',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '焦化工序日生产信息';

-- ----------------------------
-- 焦化工序-主工序指标历史
-- ----------------------------
DROP TABLE IF EXISTS `t_coking_process_main`;
CREATE TABLE `t_coking_process_main`
(
    `id`           varchar(36) NOT NULL COMMENT 'id',
    `category`     varchar(20) NULL DEFAULT NULL COMMENT '类别（日：day,班：class）',
    `clock`        varchar(20) NULL DEFAULT NULL COMMENT '查询时间',
    `info_type`    varchar(10) NULL DEFAULT NULL COMMENT '信息类型（0：生产情况，1：能源发生，2：能源消耗）',
    `ind_name`     varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '指标名称',
    `avg_value`    varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '历史平均',
    `theory_value` varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '理论值',
    `actual_value` varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '实际值',
    `stand_value`  varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '基准值',
    `real_value`   varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '实时数据',
    `sort`         int NULL DEFAULT NULL COMMENT '排序',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '焦化工序主工序指标历史';


-- ----------------------------
-- 焦化工序-子工序指标
-- ----------------------------
DROP TABLE IF EXISTS `t_coking_process_child`;
CREATE TABLE `t_coking_process_child`
(
    `id`           varchar(36) NOT NULL COMMENT 'id',
    `category`     varchar(20) NULL DEFAULT NULL COMMENT '类别（日：day,班：class）',
    `clock`        varchar(20) NULL DEFAULT NULL COMMENT '查询时间',
    `info_type`    varchar(10) NULL DEFAULT NULL COMMENT '信息类型（0：生产情况，1：能源发生，2：能源消耗）',
    `ind_type`     varchar(20) NOT NULL COMMENT '类型',
    `ind_main`     varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '重点管控指标',
    `ind_name`     varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '指标名称',
    `avg_value`    varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '历史平均',
    `theory_value` varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '理论值',
    `actual_value` varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '实际值',
    `stand_value`  varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '基准值',
    `real_value`   varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '实时数据',
    `sort`         int NULL DEFAULT NULL COMMENT '排序',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '焦化工序主子工序指标';


-- ----------------------------
-- 焦化工序-趋势分析
-- ----------------------------
DROP TABLE IF EXISTS `t_coking_analy_trend`;
CREATE TABLE `t_coking_analy_trend`
(
    `id`            varchar(36) NOT NULL COMMENT 'id',
    `analy_type`    varchar(20) NULL DEFAULT NULL COMMENT '分析类型',
    `analy_title`   varchar(20) NULL DEFAULT NULL COMMENT '分析标题',
    `analy_date`    varchar(20) NULL DEFAULT NULL COMMENT '分析日期',
    `analy_class`   varchar(20) NULL DEFAULT NULL COMMENT '分析班次',
    `analy_value`   varchar(20) NULL DEFAULT NULL COMMENT '分析值',
    `analy_content` varchar(100) NULL DEFAULT NULL COMMENT '内容',
    `sort`          int NULL DEFAULT NULL COMMENT '排序',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '焦化工序趋势分析';

-- ----------------------------
-- 焦化工序-指标分析
-- ----------------------------
DROP TABLE IF EXISTS `t_coking_analy_ind`;
CREATE TABLE `t_coking_analy_ind`
(
    `id`            varchar(36) NOT NULL COMMENT 'id',
    `analy_type`    varchar(20) NULL DEFAULT NULL COMMENT '分析类型',
    `analy_date`    varchar(20) NULL DEFAULT NULL COMMENT '分析日期',
    `analy_class`   varchar(20) NULL DEFAULT NULL COMMENT '分析班次',
    `analy_content` varchar(100) NULL DEFAULT NULL COMMENT '内容',
    `sort`          int NULL DEFAULT NULL COMMENT '排序',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '焦化工序指标分析';

alter TABLE `t_coking_analy_ind`
    add column `rel_id` varchar(36) NULL DEFAULT NULL COMMENT '关联ID' after `id`;

-------------------------焦化溯源--------------------------------------------------------------

-- ----------------------------
-- 焦化工序-异常溯源配置
-- ----------------------------
DROP TABLE IF EXISTS `t_coking_trace_conf`;
CREATE TABLE `t_coking_trace_conf`
(
    `id`        varchar(36) NOT NULL COMMENT 'id',
    `info_type` varchar(10) NULL DEFAULT NULL COMMENT '信息类型（0：生产情况，1：能源发生，2：能源消耗）',
    `ind_type`  varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '指标类型（prod_day,main,child）',
    `data_type` varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '数据类型（测点，指标）',
    `point_no`  varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '测点编码',
    `ind_code`  varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '指标编码',
    `ind_name`  varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '指标名称',
    `ind_unit`  varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '指标单位',
    `remark`    varchar(100) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '备注',
    `ext1`      varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '拓展字段1',
    `ext2`      varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '拓展字段2',
    `ext3`      varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '拓展字段3',
    `ext4`      varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '拓展字段4',
    `ext5`      varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '拓展字段5',
    `sort`      int NULL DEFAULT NULL COMMENT '排序',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '焦化工序异常溯源配置';


-- ----------------------------
-- 焦化工序-异常溯源报告
-- ----------------------------
DROP TABLE IF EXISTS `t_coking_trace_report`;
CREATE TABLE `t_coking_trace_report`
(
    `id`            varchar(36) NOT NULL COMMENT 'id',
    `process`       varchar(20) NULL DEFAULT NULL COMMENT '工序名称',
    `report_no`     varchar(36) NULL DEFAULT NULL COMMENT '报告编号',
    `report_name`   varchar(36) NULL DEFAULT NULL COMMENT '报告名称',
    `analy_date`    varchar(20) NULL DEFAULT NULL COMMENT '分析日期',
    `analy_class`   varchar(20) NULL DEFAULT NULL COMMENT '分析班次',
    `clock`         varchar(20) NULL DEFAULT NULL COMMENT '查询时间',
    `analy_content` varchar(100) NULL DEFAULT NULL COMMENT '内容',
    `create_date`   datetime COMMENT '创建时间',
    PRIMARY KEY (`id`) USING BTREE,
    key             idx_process (process),
    key             idx_clock (clock)
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '焦化工序异常溯源报告';

-- ----------------------------
-- 焦化工序-异常溯源及优化建议
-- ----------------------------
DROP TABLE IF EXISTS `t_coking_trace_suggest`;
CREATE TABLE `t_coking_trace_suggest`
(
    `id`          varchar(36) NOT NULL COMMENT 'id',
    `rel_id`      varchar(36) NULL DEFAULT NULL COMMENT '关联ID',
    `process`     varchar(20) NULL DEFAULT NULL COMMENT '工序名称',
    `sug_obj`     varchar(20) NULL DEFAULT NULL COMMENT '建议对象',
    `clock`       varchar(20) NULL DEFAULT NULL COMMENT '查询时间',
    `content`     varchar(500) NULL DEFAULT NULL COMMENT '内容',
    `create_date` datetime COMMENT '创建时间',
    PRIMARY KEY (`id`) USING BTREE,
    key           idx_process (process),
    key           idx_clock (clock)
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '焦化工序异常溯源及优化建议';

-- ----------------------------
-- 焦化工序-影响因数偏差值
-- ----------------------------
DROP TABLE IF EXISTS `t_coking_trace_deviation`;
CREATE TABLE `t_coking_trace_deviation`
(
    `id`          varchar(36) NOT NULL COMMENT 'id',
    `rel_id`      varchar(36) NULL DEFAULT NULL COMMENT '关联ID',
    `process`     varchar(20) NULL DEFAULT NULL COMMENT '工序名称',
    `sug_obj`     varchar(20) NULL DEFAULT NULL COMMENT '建议对象',
    `clock`       varchar(20) NULL DEFAULT NULL COMMENT '查询时间',
    `group_name`  varchar(20) NULL DEFAULT NULL COMMENT '分组名称',
    `ind_name`    varchar(20) NULL DEFAULT NULL COMMENT '指标名称',
    `ind_value`   varchar(20) NULL DEFAULT NULL COMMENT '偏差值',
    `ind_unit`    varchar(20) NULL DEFAULT NULL COMMENT '单位',
    `create_date` datetime COMMENT '创建时间',
    PRIMARY KEY (`id`) USING BTREE,
    key           idx_clock (clock)
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '焦化工序影响因数偏差值';

-- ----------------------------
-- 焦化工序-异常溯源折线图
-- ----------------------------
DROP TABLE IF EXISTS `t_coking_trace_chart`;
CREATE TABLE `t_coking_trace_chart`
(
    `id`          varchar(36) NOT NULL COMMENT 'id',
    `rel_id`      varchar(36) NULL DEFAULT NULL COMMENT '关联ID',
    `name`        varchar(20) NULL DEFAULT NULL COMMENT '图表名称',
    `clock`       varchar(20) NULL DEFAULT NULL COMMENT '查询时间',
    `data_type`   varchar(20) DEFAULT NULL COMMENT '数据类型（测点，指标）',
    `data_no`     varchar(20) DEFAULT NULL COMMENT '数据编码',
    `start_time`  datetime COMMENT '开始时间',
    `end_time`    datetime COMMENT '结束时间',
    `sort`        int NULL DEFAULT NULL COMMENT '排序',
    `create_date` datetime COMMENT '创建时间',
    PRIMARY KEY (`id`) USING BTREE,
    key           idx_rel_id (rel_id)
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '焦化工序异常溯源折线图';

-- ----------------------------
-- 焦化工序-数据异常
-- ----------------------------
DROP TABLE IF EXISTS `t_coking_trace_data`;
CREATE TABLE `t_coking_trace_data`
(
    `id`         varchar(36) NOT NULL COMMENT 'id',
    `rel_id`     varchar(36) NULL DEFAULT NULL COMMENT '关联ID',
    `process`     varchar(20) NULL DEFAULT NULL COMMENT '工序名称',
    `ex_obj`     varchar(20) NULL DEFAULT NULL COMMENT '异常对象',
    `clock`       varchar(20) NULL DEFAULT NULL COMMENT '查询时间',
    `data_type`  varchar(20) NULL DEFAULT NULL COMMENT '数据类型',
    `point_no`   varchar(20) NULL DEFAULT NULL COMMENT '异常点位编号',
    `point_name` varchar(20) NULL DEFAULT NULL COMMENT '异常点位名称',
    `ex_time`    datetime NULL DEFAULT NULL COMMENT '异常时间',
    `ex_type`    varchar(200) NULL DEFAULT NULL COMMENT '异常原因',
    `create_date` datetime COMMENT '创建时间',
    PRIMARY KEY (`id`) USING BTREE,
    key           idx_rel_id (rel_id)
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '焦化工序数据异常';

-- ----------------------------
-- 焦化工序-能耗整体情况
-- ----------------------------
DROP TABLE IF EXISTS `t_coking_overview`;
CREATE TABLE `t_coking_overview` (
                                     `id` varchar(36) COLLATE utf8mb4_general_ci NOT NULL COMMENT 'id',
                                     `rel_id` varchar(36) COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '关联ID',
                                     `process_type` varchar(20) COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '工序类型',
                                     `sub_process_type` varchar(20) COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '子工序类型',
                                     `clock` varchar(20) COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '查询时间',
                                     `steam_p` decimal(10,4) DEFAULT NULL COMMENT '蒸汽发生',
                                     `dj_steam_p` decimal(10,4) DEFAULT NULL COMMENT '吨焦产蒸汽',
                                     `steam_c` decimal(10,4) DEFAULT NULL COMMENT '蒸汽消耗',
                                     `steam_only_c` decimal(10,4) DEFAULT NULL COMMENT '蒸汽单耗',
                                     `steam_v` decimal(10,4) DEFAULT NULL COMMENT '蒸汽量',
                                     `gas_p` decimal(10,4) DEFAULT NULL COMMENT '煤气发生',
                                     `gas_c` decimal(10,4) DEFAULT NULL COMMENT '煤气消耗',
                                     `power_c` decimal(10,4) DEFAULT NULL COMMENT '电力消耗',
                                     `power_only_c` decimal(10,4) DEFAULT NULL COMMENT '电力单耗',
                                     `power_c_standard` decimal(10,4) DEFAULT NULL COMMENT '电耗基准',
                                     `idle_time` decimal(10,4) DEFAULT NULL COMMENT '空转时间',
                                     `bfg_c` decimal(10,4) DEFAULT NULL COMMENT 'BFG消耗',
                                     `cog_p` decimal(10,4) DEFAULT NULL COMMENT 'COG回收',
                                     `cog_c` decimal(10,4) DEFAULT NULL COMMENT 'COG消耗',
                                     `bfg_only_c` decimal(10,4) DEFAULT NULL COMMENT 'BFG单耗',
                                     `cog_only_c` decimal(10,4) DEFAULT NULL COMMENT 'COG单耗',
                                     PRIMARY KEY (`id`) USING BTREE,
                                     UNIQUE KEY `process_type_clock_unique` (`process_type`,`sub_process_type`,`clock`),
                                     KEY `idx_rel_id` (`rel_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='工序概况情况';

-- ----------------------------
-- 焦化工序-指标值溯源
-- ----------------------------
DROP TABLE IF EXISTS `t_coking_trace_ind`;
CREATE TABLE `t_coking_trace_ind`
(
    `id`        varchar(36) NOT NULL COMMENT 'id',
    `rel_id`    varchar(36) NULL DEFAULT NULL COMMENT '关联ID',
    `title`     varchar(20) NULL DEFAULT NULL COMMENT '标题',
    `clock`     varchar(20) NULL DEFAULT NULL COMMENT '查询时间',
    `ind_code`  varchar(20) NULL DEFAULT NULL COMMENT '编码',
    `ind_name`  varchar(20) NULL DEFAULT NULL COMMENT '名称',
    `ind_value` varchar(20) NULL DEFAULT NULL COMMENT '值',
    `ind_unit`  varchar(20) NULL DEFAULT NULL COMMENT '单位',
    `ext1`      varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '拓展字段1',
    `ext2`      varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '拓展字段2',
    `ext3`      varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '拓展字段3',
    `ext4`      varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '拓展字段4',
    `ext5`      varchar(20) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '拓展字段5',
    `sort`      int NULL DEFAULT NULL COMMENT '排序',
    PRIMARY KEY (`id`) USING BTREE,
    key         idx_rel_id (rel_id)
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = DYNAMIC COMMENT '焦化工序指标值溯源';
-- ----------------------------
-- 负荷移植-月最大需量，实测需量，有功功率
-- ----------------------------
CREATE TABLE `t_power_demand`
(
    `id`           varchar(36) NOT NULL COMMENT 'id',
    `name`         varchar(50)                                                  DEFAULT NULL COMMENT '机组名称',
    `max_demand`   varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci DEFAULT NULL COMMENT '月最大需量',
    `cur_demand`   varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci DEFAULT NULL COMMENT '实测需量',
    `active_power` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci DEFAULT NULL COMMENT '有功功率',
    `sort`         varchar(50)                                                  DEFAULT NULL COMMENT '排序',
    PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci COMMENT='月最大需量，实测需量，有功功率';

ALTER TABLE `t_power_demand`
    ADD COLUMN `code`  varchar(50) NULL DEFAULT NULL COMMENT '编号';


-- ----------------------------
-- 负荷移植-调整后的功率因数与无功倒送量
-- ----------------------------
CREATE TABLE `t_power_adjusted_factor` (
                                           `id` varchar(36) NOT NULL,
                                           `code` varchar(50) DEFAULT NULL COMMENT '编码',
                                           `name` varchar(50) DEFAULT NULL COMMENT '名称',
                                           `data_type`  varchar(20) NULL DEFAULT NULL COMMENT '数据类型',
                                           `point_no` varchar(50) DEFAULT NULL COMMENT '点位',
                                           `sort` varchar(50) DEFAULT NULL COMMENT '排序',
                                           PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci COMMENT='调整后的功率因数与无功倒送量';